Journal of Mathematical Systems, Estimation, and Control cfl 1996 Birkhäuser-Boston Vol. 6, No. 4, 1996, pp. 489–493

ERRATA SUMMARY The Spaces of Improper Rational Matrices and ARMA-Systems of Fixed McMillan Degree^�

Filippo de Mari Heide Glüsing-Lüerßen

Errata

Due to a TEXing error using blackboard bold, this summary as first published in Volume 5, Number 1, 1995, was inherently nonreadable. The following copy of the summary corrects the misread equations. The full electronic manuscript (published January 1, 1995) is unaffected.

We regret this error.

�Received June 18, 1992; received in final form September 16, 1992. Summary appeared in Volume 5, No. 1, 1995. Full electronic manuscript (published January 1, 1995) = 19 pp, 223,628 bytes. Retrieval Code: errata02894