Journal of Mathematical Systems, Estimation, and Control cfl 1997 Birkhäuser-Boston Vol. 7, No. 1, 1997, pp. 128–

ERRATA SUMMARY Robust Adaptive Control of Discrete-Time Systems with Arbitrary Rate of Variations^�

A. Jerbi^y E. W. Kamen^y

The summary of this paper appeared in Volume 6, Number 4, 1996, with a typographical error in the first line of its title. In the first line the word “Large” should be deleted. The title should read: Robust Adaptive Control of Discrete-Time Systems with Arbitrary Rate of Variations.

The editors regret this error.

�Received March 22, 1995; received in final form October 18, 1995. Full electronic manuscript (published October 1, 1996) = 31 pp, 549,818 bytes. Retrieval Code: 47479 yThis work was supported in part by Eglin Air Force Base under Contract No.

F08635-90-0210.